ALTER TABLE `wuhuyancao`.`warning_rule_detail` 
ADD COLUMN `DEVICE_NAME` varchar(200) CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci NULL DEFAULT NULL COMMENT '监控点名称' AFTER `REGION_ID`,
ADD COLUMN `DEVICE_ID` varchar(200) CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci NULL DEFAULT NULL COMMENT '监控点主键' AFTER `DEVICE_NAME`;