CREATE TABLE IF NOT EXISTS `collection_dock_device` (
  `id` int(11) NOT NULL AUTO_INCREMENT COMMENT '主键',
  `station_id` int(11) NOT NULL COMMENT '采集站ID',
  `device_id` varchar(64) NOT NULL COMMENT 'ISAPI deviceId',
  `device_name` varchar(128) DEFAULT NULL COMMENT '设备名称',
  `short_serial_number` varchar(64) DEFAULT NULL COMMENT '执法记录仪短序列号',
  `access_device_id` varchar(64) DEFAULT NULL COMMENT '平台注册ID',
  `networked_device` int(11) DEFAULT NULL COMMENT '是否联网设备 0否1是',
  `last_sync_time` datetime DEFAULT NULL COMMENT '最近同步时间',
  `create_date` datetime DEFAULT NULL COMMENT '创建时间',
  `isdeleted` int(11) DEFAULT '0' COMMENT '是否删除0否1是',
  PRIMARY KEY (`id`),
  UNIQUE KEY `uk_station_device` (`station_id`,`device_id`),
  KEY `idx_station_id` (`station_id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='采集站执法记录仪设备';
