CREATE TABLE IF NOT EXISTS `collection_station` (
  `id` int(11) NOT NULL AUTO_INCREMENT COMMENT '主键',
  `creator` varchar(64) DEFAULT NULL COMMENT '创建人编码',
  `create_date` datetime DEFAULT NULL COMMENT '创建时间',
  `edirot` varchar(64) DEFAULT NULL COMMENT '更新人编码',
  `edit_date` datetime DEFAULT NULL COMMENT '更新时间',
  `isdeleted` int(11) DEFAULT '0' COMMENT '是否删除0否 1是',
  `remark` varchar(512) DEFAULT NULL COMMENT '备注',
  `name` varchar(128) DEFAULT NULL COMMENT '采集站名称',
  `serial_no` varchar(64) DEFAULT NULL COMMENT '设备序列号',
  `ip` varchar(64) DEFAULT NULL COMMENT '设备IP',
  `port` int(11) DEFAULT '80' COMMENT '设备端口(ISAPI默认80)',
  `use_https` int(11) DEFAULT '0' COMMENT '是否HTTPS 0否1是',
  `username` varchar(64) DEFAULT NULL COMMENT '登录用户名',
  `password` varchar(128) DEFAULT NULL COMMENT '登录密码',
  `model` varchar(64) DEFAULT 'UD39625B' COMMENT '设备型号',
  `online` int(11) DEFAULT '0' COMMENT '在线状态 0离线 1在线',
  `total_space` bigint(20) DEFAULT NULL COMMENT '总存储空间(GB)',
  `free_space` bigint(20) DEFAULT NULL COMMENT '剩余存储空间(GB)',
  `software_version` varchar(64) DEFAULT NULL COMMENT '软件版本',
  `last_sync_time` datetime DEFAULT NULL COMMENT '最近同步时间',
  `status` int(11) DEFAULT '1' COMMENT '状态 0禁用 1启用',
  PRIMARY KEY (`id`),
  KEY `idx_serial_no` (`serial_no`),
  KEY `idx_ip` (`ip`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='海康桌面采集站设备';
