INSERT INTO `SYSTEM_PERMISSION`(`CODE`, `NAME`, `REMARK`, `FIXED`, `CREATE_USER`, `CREATE_TIME`, `UPDATE_USER`, `UPDATE_TIME`, `DELETED`) VALUES ('business:ywconditioner:create', '新建空调设备信息', '', 0, 1, CURRENT_TIMESTAMP, NULL, NULL, 0);
INSERT INTO `SYSTEM_PERMISSION`(`CODE`, `NAME`, `REMARK`, `FIXED`, `CREATE_USER`, `CREATE_TIME`, `UPDATE_USER`, `UPDATE_TIME`, `DELETED`) VALUES ('business:ywconditioner:delete', '删除空调设备信息', '', 0, 1, CURRENT_TIMESTAMP, NULL, NULL, 0);
INSERT INTO `SYSTEM_PERMISSION`(`CODE`, `NAME`, `REMARK`, `FIXED`, `CREATE_USER`, `CREATE_TIME`, `UPDATE_USER`, `UPDATE_TIME`, `DELETED`) VALUES ('business:ywconditioner:update', '修改空调设备信息', '', 0, 1, CURRENT_TIMESTAMP, NULL, NULL, 0);
INSERT INTO `SYSTEM_PERMISSION`(`CODE`, `NAME`, `REMARK`, `FIXED`, `CREATE_USER`, `CREATE_TIME`, `UPDATE_USER`, `UPDATE_TIME`, `DELETED`) VALUES ('business:ywconditioner:query', '查询空调设备信息', '', 0, 1, CURRENT_TIMESTAMP, NULL, NULL, 0);
INSERT INTO `SYSTEM_PERMISSION`(`CODE`, `NAME`, `REMARK`, `FIXED`, `CREATE_USER`, `CREATE_TIME`, `UPDATE_USER`, `UPDATE_TIME`, `DELETED`) VALUES ('business:ywconditioner:exportExcel', '导出空调设备信息(Excel)', '', 0, 1, CURRENT_TIMESTAMP, NULL, NULL, 0);
