INSERT INTO `SYSTEM_PERMISSION`(`CODE`, `NAME`, `REMARK`, `FIXED`, `CREATE_USER`, `CREATE_TIME`, `UPDATE_USER`, `UPDATE_TIME`, `DELETED`) VALUES ('business:ywelectrical:create', '新建电表设备信息', '', 0, 1, CURRENT_TIMESTAMP, NULL, NULL, 0);
INSERT INTO `SYSTEM_PERMISSION`(`CODE`, `NAME`, `REMARK`, `FIXED`, `CREATE_USER`, `CREATE_TIME`, `UPDATE_USER`, `UPDATE_TIME`, `DELETED`) VALUES ('business:ywelectrical:delete', '删除电表设备信息', '', 0, 1, CURRENT_TIMESTAMP, NULL, NULL, 0);
INSERT INTO `SYSTEM_PERMISSION`(`CODE`, `NAME`, `REMARK`, `FIXED`, `CREATE_USER`, `CREATE_TIME`, `UPDATE_USER`, `UPDATE_TIME`, `DELETED`) VALUES ('business:ywelectrical:update', '修改电表设备信息', '', 0, 1, CURRENT_TIMESTAMP, NULL, NULL, 0);
INSERT INTO `SYSTEM_PERMISSION`(`CODE`, `NAME`, `REMARK`, `FIXED`, `CREATE_USER`, `CREATE_TIME`, `UPDATE_USER`, `UPDATE_TIME`, `DELETED`) VALUES ('business:ywelectrical:query', '查询电表设备信息', '', 0, 1, CURRENT_TIMESTAMP, NULL, NULL, 0);
INSERT INTO `SYSTEM_PERMISSION`(`CODE`, `NAME`, `REMARK`, `FIXED`, `CREATE_USER`, `CREATE_TIME`, `UPDATE_USER`, `UPDATE_TIME`, `DELETED`) VALUES ('business:ywelectrical:exportExcel', '导出电表设备信息(Excel)', '', 0, 1, CURRENT_TIMESTAMP, NULL, NULL, 0);
INSERT INTO `SYSTEM_PERMISSION`(`CODE`, `NAME`, `REMARK`, `FIXED`, `CREATE_USER`, `CREATE_TIME`, `UPDATE_USER`, `UPDATE_TIME`, `DELETED`) VALUES ('business:ywelectrical:device', '同步电表设备', '', 0, 1, CURRENT_TIMESTAMP, NULL, NULL, 0);
