INSERT INTO `SYSTEM_PERMISSION`(`CODE`, `NAME`, `REMARK`, `FIXED`, `CREATE_USER`, `CREATE_TIME`, `UPDATE_USER`, `UPDATE_TIME`, `DELETED`) VALUES ('business:ywelectricalparam:create', '新建电表参数', '', 0, 1, CURRENT_TIMESTAMP, NULL, NULL, 0);
INSERT INTO `SYSTEM_PERMISSION`(`CODE`, `NAME`, `REMARK`, `FIXED`, `CREATE_USER`, `CREATE_TIME`, `UPDATE_USER`, `UPDATE_TIME`, `DELETED`) VALUES ('business:ywelectricalparam:delete', '删除电表参数', '', 0, 1, CURRENT_TIMESTAMP, NULL, NULL, 0);
INSERT INTO `SYSTEM_PERMISSION`(`CODE`, `NAME`, `REMARK`, `FIXED`, `CREATE_USER`, `CREATE_TIME`, `UPDATE_USER`, `UPDATE_TIME`, `DELETED`) VALUES ('business:ywelectricalparam:update', '修改电表参数', '', 0, 1, CURRENT_TIMESTAMP, NULL, NULL, 0);
INSERT INTO `SYSTEM_PERMISSION`(`CODE`, `NAME`, `REMARK`, `FIXED`, `CREATE_USER`, `CREATE_TIME`, `UPDATE_USER`, `UPDATE_TIME`, `DELETED`) VALUES ('business:ywelectricalparam:query', '查询电表参数', '', 0, 1, CURRENT_TIMESTAMP, NULL, NULL, 0);
INSERT INTO `SYSTEM_PERMISSION`(`CODE`, `NAME`, `REMARK`, `FIXED`, `CREATE_USER`, `CREATE_TIME`, `UPDATE_USER`, `UPDATE_TIME`, `DELETED`) VALUES ('business:ywelectricalparam:exportExcel', '导出电表参数(Excel)', '', 0, 1, CURRENT_TIMESTAMP, NULL, NULL, 0);
