INSERT INTO `SYSTEM_PERMISSION`(`CODE`, `NAME`, `REMARK`, `FIXED`, `CREATE_USER`, `CREATE_TIME`, `UPDATE_USER`, `UPDATE_TIME`, `DELETED`) VALUES ('business:ywelectricalwarning:query', '查询智能电表报警记录', '', 0, 1, CURRENT_TIMESTAMP, NULL, NULL, 0);
INSERT INTO `SYSTEM_PERMISSION`(`CODE`, `NAME`, `REMARK`, `FIXED`, `CREATE_USER`, `CREATE_TIME`, `UPDATE_USER`, `UPDATE_TIME`, `DELETED`) VALUES ('business:ywelectricalwarning:exportExcel', '导出智能电表报警记录(Excel)', '', 0, 1, CURRENT_TIMESTAMP, NULL, NULL, 0);
INSERT INTO `SYSTEM_PERMISSION`(`CODE`, `NAME`, `REMARK`, `FIXED`, `CREATE_USER`, `CREATE_TIME`, `UPDATE_USER`, `UPDATE_TIME`, `DELETED`) VALUES ('business:ywelectricalwarning:sync', '同步智能电表报警记录', '', 0, 1, CURRENT_TIMESTAMP, NULL, NULL, 0);
