CREATE TABLE `yw_gateway` (
  `id` int(11) NOT NULL AUTO_INCREMENT COMMENT '主键',
  `creator` int(11) DEFAULT NULL COMMENT '创建人编码',
  `create_date` datetime DEFAULT NULL COMMENT '创建时间',
  `editor` int(11) DEFAULT NULL COMMENT '更新人编码',
  `edit_date` datetime DEFAULT NULL COMMENT '更新时间',
  `isdeleted` int(1) DEFAULT '0' COMMENT '是否删除 0否 1是',
  `name` varchar(100) DEFAULT NULL COMMENT '网关名称',
  `remark` varchar(500) DEFAULT NULL COMMENT '备注',
  `status` int(1) DEFAULT '0' COMMENT '状态 0启用 1禁用',
  `sortnum` int(11) DEFAULT NULL COMMENT '排序码',
  `gateway_model` varchar(100) DEFAULT NULL COMMENT '网关型号',
  `gateway_code` varchar(100) DEFAULT NULL COMMENT '网关设备号',
  `last_heartbeat_time` datetime DEFAULT NULL COMMENT '最后心跳时间',
  `project_id` int(11) DEFAULT NULL COMMENT '所属项目编码（关联yw_project）',
  PRIMARY KEY (`id`),
  KEY `idx_gateway_code` (`gateway_code`),
  KEY `idx_project_id` (`project_id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='网关管理';
